\section{ipa\+\_\+head Struct Reference}
\label{structipa__head}\index{ipa\+\_\+head@{ipa\+\_\+head}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structipa__head_a9bbcada25e9b0877527f6cb0a643aa0c}} 
uint16\+\_\+t {\bfseries len}
\item 
\mbox{\label{structipa__head_af9d1353ce62c64cb88070fe9dae29906}} 
uint8\+\_\+t {\bfseries proto}
\item 
\mbox{\label{structipa__head_a4a4616c284c8fdb6598ee46fb616ae90}} 
uint8\+\_\+t {\bfseries data} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/ipa.\+h\end{DoxyCompactItemize}
