\doxysection{osmo\+\_\+icmpv6\+\_\+rsol\+\_\+hdr Struct Reference}
\label{structosmo__icmpv6__rsol__hdr}\index{osmo\_icmpv6\_rsol\_hdr@{osmo\_icmpv6\_rsol\_hdr}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__rsol__hdr_ae68cdcc23d47ad9b654ad851dc277796}} 
struct \textbf{ osmo\+\_\+icmpv6\+\_\+hdr} {\bfseries hdr}
\item 
\mbox{\label{structosmo__icmpv6__rsol__hdr_a3bd98e8a421b734e92472518fc62e69c}} 
uint32\+\_\+t {\bfseries reserved}
\item 
\mbox{\label{structosmo__icmpv6__rsol__hdr_a451a9e89d4812248ed6aba98835913c0}} 
uint8\+\_\+t {\bfseries options} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
