\doxysection{osmo\+\_\+icmpv6\+\_\+radv\+\_\+hdr Struct Reference}
\label{structosmo__icmpv6__radv__hdr}\index{osmo\_icmpv6\_radv\_hdr@{osmo\_icmpv6\_radv\_hdr}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_a3851b2fafbd7e8a62d9a2729ea81b5b6}} 
struct \textbf{ osmo\+\_\+icmpv6\+\_\+hdr} {\bfseries hdr}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_a7c91d13cc9fc9cd09935fa305124e39f}} 
uint8\+\_\+t {\bfseries cur\+\_\+ho\+\_\+limit}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_abd91fee7aeeb783155e982b968b6dddc}} 
uint16\+\_\+t {\bfseries router\+\_\+lifetime}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_a73017390fa6253aab9c256b5f790359d}} 
uint32\+\_\+t {\bfseries reachable\+\_\+time}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_a998fe5b08d0e0c52474d0c516de12ba4}} 
uint32\+\_\+t {\bfseries retrans\+\_\+timer}
\item 
\mbox{\label{structosmo__icmpv6__radv__hdr_ae0b34ce28dbea0aa53c293dd76905c3e}} 
uint8\+\_\+t {\bfseries options} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
