\doxysection{osmo\+\_\+icmpv6\+\_\+opt\+\_\+prefix Struct Reference}
\label{structosmo__icmpv6__opt__prefix}\index{osmo\_icmpv6\_opt\_prefix@{osmo\_icmpv6\_opt\_prefix}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_abdba1cfe1aa924d82cf9b59cce4070d1}} 
struct \textbf{ osmo\+\_\+icmpv6\+\_\+opt\+\_\+hdr} {\bfseries hdr}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_a2888b6accd2ad9a2ebe42dc33299e827}} 
uint8\+\_\+t {\bfseries prefix\+\_\+len}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_adfb92ce56c06c7dc9b01a55a31e34b88}} 
uint32\+\_\+t {\bfseries valid\+\_\+lifetime}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_a299f5caa74cafc5b1abff0e5670b5695}} 
uint32\+\_\+t {\bfseries preferred\+\_\+lifetime}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_a1087be35b2e8e0a223abf2cd55215432}} 
uint32\+\_\+t {\bfseries res2}
\item 
\mbox{\label{structosmo__icmpv6__opt__prefix_a75c09abda07efc25069caffb1d946581}} 
uint8\+\_\+t {\bfseries prefix} [16]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
