\doxysection{osmo\+\_\+icmpv6\+\_\+opt\+\_\+mtu Struct Reference}
\label{structosmo__icmpv6__opt__mtu}\index{osmo\_icmpv6\_opt\_mtu@{osmo\_icmpv6\_opt\_mtu}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__opt__mtu_a7f8b2a0f4a19158683f548958cb18d60}} 
struct \textbf{ osmo\+\_\+icmpv6\+\_\+opt\+\_\+hdr} {\bfseries hdr}
\item 
\mbox{\label{structosmo__icmpv6__opt__mtu_ab71fb910b0c5c1ff6ec957b9a3516e0e}} 
uint16\+\_\+t {\bfseries reserved}
\item 
\mbox{\label{structosmo__icmpv6__opt__mtu_a168ed2eecff67934b923f084e3293148}} 
uint32\+\_\+t {\bfseries mtu}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
