\doxysection{osmo\+\_\+icmpv6\+\_\+opt\+\_\+hdr Struct Reference}
\label{structosmo__icmpv6__opt__hdr}\index{osmo\_icmpv6\_opt\_hdr@{osmo\_icmpv6\_opt\_hdr}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__opt__hdr_a90825dd3e7462377c6464d6a470d6c55}} 
uint8\+\_\+t {\bfseries type}
\item 
\mbox{\label{structosmo__icmpv6__opt__hdr_afe3bc2c0df99b84ae1d830efbbfcb560}} 
uint8\+\_\+t {\bfseries len}
\item 
\mbox{\label{structosmo__icmpv6__opt__hdr_ad3395ecadb6775093d78da098e21adc1}} 
uint8\+\_\+t {\bfseries data} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
