\doxysection{osmo\+\_\+icmpv6\+\_\+echo\+\_\+hdr Struct Reference}
\label{structosmo__icmpv6__echo__hdr}\index{osmo\_icmpv6\_echo\_hdr@{osmo\_icmpv6\_echo\_hdr}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__echo__hdr_a262b8edb82373bb04159b48271de3a55}} 
struct \textbf{ osmo\+\_\+icmpv6\+\_\+hdr} {\bfseries hdr}
\item 
\mbox{\label{structosmo__icmpv6__echo__hdr_af2c55fdf90335616f960b6b1e41019fb}} 
uint16\+\_\+t {\bfseries ident}
\item 
\mbox{\label{structosmo__icmpv6__echo__hdr_a41108cd106238312ccc827b59c57473c}} 
uint16\+\_\+t {\bfseries seq}
\item 
\mbox{\label{structosmo__icmpv6__echo__hdr_aa852b6a9a930ae70f5f770578e2d244e}} 
uint8\+\_\+t {\bfseries data} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
